# Configuration file for building MPI benchmark suite
# Script to compile MPI programs
MPICC = mpicc
# Compile-time definitions
DEFINES = -D_USE_MPI_WTIME
# Compile flags
CCFLAGS = -cm $(DEFINES)
# Script to link MPI programs
MPILINK = mpicc
# Link flags
LFLAGS = -lm
# Directory where the executables will be placed
BINDIR = ../bin
# Shell copy and remove commands
COPY = cp -f
REMOVE = rm -f
