                              Analysis by Doctor Laser, Version 1.0.0

This printer is a  running version 3010 of Postscript.

Available Fonts : (PaintType)FontName:Example of font
PaintType = 0(filled), 1(stroked), 2(outlined),
            3(mixed), ?(unknown)

                                                          Virtual Memory Status:

                                                              Maximum Available Bytes =
                                                              Bytes currently in use  =
                                                              Level of Save Nesting   =

                                                          Cache status (Red book p126):

                                                              blimit =
                                                                cmax =
                                                               csize =
                                                                mmax =
                                                               msize =
                                                                bmax =
                                                               bsize =

                                                                 Time to print
                                                                 the above graphic
                                                                 was 0 seconds.

Time in seconds to print the above image was 0